;start(SPECIAL INSTRUCTIONS)


;******* DO NOT CHANGE ANYTHING ABOVE THIS LINE*****************

;****** YOU CAN ADD A NUMBER OF LINES BETWEEN THE MARKED AREAS *******


 `SPECIAL INSTRUCTIONS for 4687 Scanners that CANNOT be repaired in the field.`

;                  SUGGESTION
;    In this Area you can place condensed information.


;******* DO NOT CHANGE ANYTHING BELOW THIS LINE*****************
     Press <ENTER> to see ^ADDITIONAL^ instructions.

;end(SPECIAL INSTRUCTIONS)
;start(ADDITIONAL)
;******* DO NOT CHANGE ANYTHING ABOVE THIS LINE*****************

 `SPECIAL INSTRUCTIONS for 4687 Scanners that CANNOT be repaired in the field.`


    Use an editor to alter the file 'SPECIAL.INS' and insert any
    specific instructions regarding the handling of scanners that have
    special requirements in your country.

;               SUGGESTION

; In this area you can place expanded information.

;******* DO NOT CHANGE ANYTHING BELOW THIS LINE*****************
;end(Additional)


