  EOZSHOW HELP file -
  column 1 -
  blank=comments, v=view help, z=zoom help p=property panel, l=imagelist header
  m=message
 
  column 2 - Only display this line if:-
  0=always, 1=multiimage doc, 2=data entry (/d), 4=zoom (/z), 8= RFT or MODCA
 
  Main viewing help panel (maximum 19 lines starting 'v')
v0╔══════════════════════════════════════════════════════════════════════════════╗
v0║                                Image Display                                 ║
v0║                                                                              ║
v0║    Esc          to return to the book panel                                  ║
v0║    Arrow keys   to scroll/pan                                                ║
v0║    Spacebar     to stop scroll/pan                                           ║
v0║    Home/End     to position top/bottom                                       ║
v0║    i            to invert image (negative)                                   ║
v0║    Del          to refresh current picture                                   ║
v0║    +            to maximize image size                                       ║
v0║    -            to minimize image size                                       ║
v4║    Enter        to start zoom mode                                           ║
v0║                                                                              ║
v0║                                                           Esc=Cancel         ║
v0╚══════════════════════════════════════════════════════════════════════════════╝
 
  Help panel for zoom (maximum 13 lines starting 'z')
z0╔══════════════════════════════════════════════════════════════════════════════╗
z0║                           Image Display Zoom Mode                            ║
z0║                                                                              ║
z0║    Enter        to return to normal view mode                                ║
z0║    Arrow keys   to move zoom box                                             ║
z0║    Esc          to remove/restore background image                           ║
z0║    Home/End     to move zoom box to top/bottom of image                      ║
z0║    +            to increase zoom box size                                    ║
z0║    -            to decrease zoom box size                                    ║
z0║                                                                              ║
z0║                                                           Esc=Cancel         ║
z0╚══════════════════════════════════════════════════════════════════════════════╝
 
 
  Header for list of images panel (maximum 4 lines starting 'l')
l0                           List of Images                                       '
l0              Press =xx to see the corresponding picture.                       '
l8                  Press t to see text in document                               '
l0                                                                                '
 
  Messages
  1= during decode (max length 15)
m1Please Wait ...
  2= during create of zoom data (max length 15)
m2Please Wait ...
  3=display panel header (max length 48)
m3 F1=Help  Esc=Return to book panel                                                '
  4=zoom panel header (max length 48)
m4 F1=Help  Enter=End zoom  Esc=Clear background                                    '
  5=data file error while displaying
m5Document format error. Press Esc to quit, Enter to continue
  6=image data error while displaying
m6Error in Image data
 
#    Must have this as last record of data - can have other lines after this
